hclog

Date entry

6063

06/27/98

6062

06/27/98 6079

06/27/98

6082

06/27/98

6728

07/19/98

6729

07/19/98

6837

07/23/98 7026

07/26/98 7040

07/27/98 7109

07/31/98 7694

08/11/98

7696

08/11/98 7922

08/18/98

7993

08/20/98 8022

08/20/98

8023

08/20/98

8033

08/20/98

8040

08/20/98 8354

08/29/98 8805

09/08/98 9517

10/01/98

Notes

Run No

Beam current

Target

Rates currents

PMT

Other shield

Target shield

Shield in front of neutron detector nA Bars

Paddles

PMT R

PMT L

Bars

PMT R

PMT L

Veto Pb Pb Thickness

Thickness

Thickness

Layers BCM1 kHz Layer kHz Layer

Current

Layer uA uA Layer mm mm Al mm CH2 mm Pb 100 CH2 70 1 50 1 0 0 0 0 8.3 3 50 2 45 2 25 3 25 4 15 5 0 0 25.4 1 8.3 3 100 CH2 56 45 1 37 28 1 0 0 25.4 1 8.3 3 55 49 2 25 24 2 22 21 3 34 18 4 16 11 5 45 1 28 1 0 0 25.4 1 8.3 3 22 2 HV < 1650 100 CH2 33 1 26 1 6.35 1 25.4 1 8.3 3 17 2 20.5 2 15 3 24 4 10 5 HV < 1650 100 CH2 1100 1 10000 1 6.35 1 25.4 1 8.3 3 540 2 5500 2 500 3 380 4 170 5 Proton energy losses

6.35 1 25.4 1 8.3 3 203.2

6.35 1 25.4 1 8.3 3 All rates reduced 50%

203.2

6.35 1 25.4 1 8.3 3 60 Empty 127 1 560 1 45 45 1 60 ? 1 203.2

6.35 1 25.4 1 8.3 3 HV > ~1700 50 C 34 1 55 1 203.2

6.35 1 25.4 1 11.1 4 23 2 27 2 17 3 13 4 11.5 5 New counters

47.5 1 42 1 50 C 105 1 360 1(?)

203.2

6.35 1 25.4 1 11.1 4 BCM2 ?

21371 75 ND3 104.5 1 592 1 203.2

6.35 1 25.4 1 11.1 4 BCM2 ?

21397 75 ND3 72 1 440.5 1 Block target BCM2 ?

21398 75 hole 24 1 157.5 1 Block target Threshold 30 mV

21311 62 ND3 560.5 1 203.2

6.35 1 25.4 1 11.1 4 BCM2 75 ND3 180 Events Hz

HMS deck

203.2

6.35 1 25.4 1 11.1 4 BCM2 75 hole 40 HMS deck BCM2? 75 ND3 170 Events Hz

HMS deck

203.2

6.35 1 25.4 1 11.1 4 BCM2? 75 hole 40 HMS deck 21386 84 ND3 1 Normaliz. Hz

203.2

6.35 1 25.4 1 11.1 4 21472 62 ND3 0.95

HMS deck = 75 nA BCM2 60 ND3 498 1 203.2

6.35 1 25.4 1 11.1 4 203.2 0 0 25.4 1 16.7 6 3 Pb layers ea.2.5mm ndet PMTs

203.2 0 0 25.4 1 16.7 6 Proton energy losses

203.2 0 0 25.4 1 16.7 6