S1 S2 S3 S4 S5 S6 S7 S8 S9 S 1 0 S 1 2S 1 1

-HV R1

R4 R3 R5 R6 R7 R8 R9 R10 R11 R12 R13 R14 R15 R16 R17 R18 R19 R22

R23 R24

R2

R20 R21

C1 C2 C3 C4 C5 C7 C6

C8 OUT GND GND -OUT1 -OUT2

-800V GND GND D1

D2 D3 D4 D5 D6 D7 D8

brown

green

blue yellow grey red

1 9 1 8 2 1 5 4 1 6 5 1 3 6 1 2 7 1 1 8 1 0

9

R1 34.8k R2 34.8k R3 1.5M R4 1.5M R5 1 2 1 k R6 1 6 2 k R7 1 2 1 k R8 1 2 1 k R9 1 2 1 k R10 1 2 1 k R11 1 2 1 k R12 1 2 1 k R13 1 5 0 k R14 1.5M R15 1.5M R16 1.5M R17 1.5M R18 1.5M R19 1 0 0 R20 1 5 0 R21 5 1 R22 5 1 R23 1 0 k R24 1 0 k

D1 1 0 D 1 0 D2 1 5 0 V 1N 5383B D3 1 5 0 V 1N 5383B D4 1 5 0 V 1N 5383B D5 1 0 0 V 1N 5378B D6 1 0 0 V 1N 5378B D7 1 0 0 V 1N 5378B D8 1 5 0 V 1N 5383B

C1 1 n C2 1 n C3 1 n C4 2.2n C5 4.7n C6 1 0 n C7 1 0 n C8 1 n C9 1 0 n