%% This document created by Scientific Word (R) Version 2.0


\documentclass[12pt]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=Article/ART4.LAT,jart,sw20jart}

\input tcilatex
\addtolength{\topmargin}{-0.8in}
\addtolength{\oddsidemargin}{-0.4in}
\addtolength{\textheight}{1.2in}
\addtolength{\textwidth}{0.8in}
\thispagestyle{empty}
\QQQ{Language}{
American English
}

\begin{document}


\end{document}
